From 6b8c4a8a6b14a561532656db27e5a0be408c214f Mon Sep 17 00:00:00 2001
From: Aria Shrimpton <me@aria.rip>
Date: Sun, 31 Mar 2024 19:38:29 +0100
Subject: fix overfull hbox errors

---
 thesis/parts/results.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'thesis/parts/results.tex')

diff --git a/thesis/parts/results.tex b/thesis/parts/results.tex
index cc66073..76247a4 100644
--- a/thesis/parts/results.tex
+++ b/thesis/parts/results.tex
@@ -213,7 +213,7 @@ In all but two of our test cases (marked with *), we correctly identify the best
   \label{table:predicted_actual}
 \end{table}
 
-Both of these failures appear to be caused by being overly eager to suggest a \code{LinkedList}.
+Both of these failures appear to be caused by our system being overly eager to suggest a \code{LinkedList}.
 From looking at detailed profiling information, it seems that both of these container types had a relatively small amount of items in them.
 Therefore this is likely caused by our cost models being inaccurate at small $n$ values, as mentioned in section \ref{section:cm_small_n}.
 
-- 
cgit v1.2.3

